<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{group__cgi}{}\section{cgi handling}
\label{group__cgi}\index{cgi handling@{cgi handling}}
\subsubsection*{C\+GI handling}

These functions allow low-\/level control over stdin/out/err of the cgi.

However for most cases, binding the cgi to http in and out, the default lws implementation already does the right thing. </pre></body></html>